Retro Toolbox Manual

Index

Copyright © 1993, 1994, 1995, Khoral Reaserch, Inc. All rights reserved.

Index L lrfclass 2-1 lrftrain 2-4 V v1bgamut 2-8 vbandsp1 2-9 vbandsp3 2-10 vcast 2-12 vclose 2-13 vcltrans 2-14 vcmtrans 2-17 vconvert 2-19 vconvolve 2-20 vcost 2-21 vdetilt 2-22 vdistance 2-23 vdrf 2-24 vdyth 2-31 venhance 2-32 vextract 2-33 vfht 2-34 vfractal 2-36 vgamth 2-38 vgbox 2-39 vgcirc 2-41 vgef 2-42 vgettilt 2-50 vgfractal 2-51 vgpwl 2-54 vgrow 2-55 vhmed 2-56 vhxray 2-57 vinverse 2-58 vkmeans 2-60 vlabel 2-63 vmarr 2-67 vmediaxis 2-67 vmindis 2-69 vmos2band 2-70 vpml 2-73 vqerr 2-75 vqmed 2-76 vquant 2-77 vsamp 2-78 vsdef 2-80 vshape 2-88 vslope 2-94 vspatial 2-96 vspeckle 2-98 vsurf 2-99 vtexture 2-100 vtilt 2-102 vwiener 2-103 vwmdd 2-104

I - 1